From 6b59bcb1d8aa4e97bca55bf464c5832d0c0fbc43 Mon Sep 17 00:00:00 2001
From: Nao Pross <np@0hm.ch>
Date: Thu, 16 Dec 2021 18:39:38 +0100
Subject: Typo without

---
 doc/thesis/chapters/implementation.tex | 40 ++++++++++++++--------------------
 1 file changed, 16 insertions(+), 24 deletions(-)

(limited to 'doc/thesis/chapters/implementation.tex')

diff --git a/doc/thesis/chapters/implementation.tex b/doc/thesis/chapters/implementation.tex
index 7be6763..aa394bf 100644
--- a/doc/thesis/chapters/implementation.tex
+++ b/doc/thesis/chapters/implementation.tex
@@ -280,35 +280,27 @@ In order to study the effects of multipath fading, a series of simulations have
 
 \begin{figure}
 	\centering
-	\input{figures/tikz/qpsk-sim-constellations-whitout-effects}
+	\input{figures/tikz/qpsk-sim-constellations-without-effects}
+	\caption{
+		TODO
+	}
+\end{figure}
+
+\begin{figure}
+	\centering
+	\input{figures/tikz/qpsk-sim-constellations-static}
 	\caption{
 		Constellation diagrams for a simulated link using QPSK with AWGN and Rayleighan fading.
 	}
 \end{figure}
 
-%\begin{figure}
-%	\centering
-%	\input{figures/tikz/qpsk-sim-constellations-static}
-%	\caption{
-%		Constellation diagrams for a simulated link using QPSK with AWGN and Rayleighan fading.
-%	}
-%\end{figure}
-
-%\begin{figure}
-%	\centering
-%	\input{figures/tikz/qpsk-sim-constellations-static-symb}
-%	\caption{
-%		Constellation diagrams for a simulated link using QPSK with the discrete time model block.
-%	}
-%\end{figure}
-%
-%\begin{figure}
-%	\centering
-%	\input{figures/tikz/qpsk-sim-constellations-dynamic}
-%	\caption{
-%		Constellation diagrams for a simulated link using QPSK with AWGN and Rayleighan fading. The paramters are: frequency offset of 0.2 \%, \SI{100}{\milli\volt} noise, dopper shift for \(v = \SI{2}{\meter\per\second}\), and a NLOS urban PDP.
-%	}
-%\end{figure}
+\begin{figure}
+	\centering
+	\input{figures/tikz/qpsk-sim-constellations-dynamic}
+	\caption{
+		Constellation diagrams for a simulated link using QPSK with AWGN and Rayleighan fading. The paramters are: frequency offset of 0.2 \%, \SI{100}{\milli\volt} noise, dopper shift for \(v = \SI{2}{\meter\per\second}\), and a NLOS urban PDP.
+	}
+\end{figure}
 
 \subsection{Fading with discrete time model}
 
-- 
cgit v1.2.1

