From d8c0e7af2f60cc91cbd9e651b4e1495dae870df4 Mon Sep 17 00:00:00 2001
From: sara <sara.halter@gmx.ch>
Date: Mon, 25 Oct 2021 20:17:56 +0200
Subject: Hardware AM Simulation kleine Anpassungen vorgenomen

---
 doc/thesis/chapters/implementation.tex | 5 ++++-
 1 file changed, 4 insertions(+), 1 deletion(-)

(limited to 'doc/thesis/chapters/implementation.tex')

diff --git a/doc/thesis/chapters/implementation.tex b/doc/thesis/chapters/implementation.tex
index 41bcecc..45e9664 100644
--- a/doc/thesis/chapters/implementation.tex
+++ b/doc/thesis/chapters/implementation.tex
@@ -3,7 +3,10 @@
 \chapter{Implementation}
 
 \section{Simulaton}
-
+ For 
 \section{Hardware}
+ USRP B210 
+ RF frequencies from 70MHz to 6GHz
+ Bandwidth 200kHz-56MHz
 \section{Measurements}
 \section{Results}
-- 
cgit v1.2.1

