% vim: set ts=2 sw=2 noet:

\chapter{Implementation}

\section{Simulaton}
 For 
\section{Hardware}
 USRP B210 
 RF frequencies from 70MHz to 6GHz
 Bandwidth 200kHz-56MHz
\section{Measurements}
\section{Results}
