From 96ca6105b6adad8a6b3c5a1af426df9f8c4024c0 Mon Sep 17 00:00:00 2001
From: =?UTF-8?q?Andreas=20M=C3=BCller?= <andreas.mueller@othello.ch>
Date: Mon, 15 Aug 2022 06:54:23 +0200
Subject: fix physics dependency

---
 buch/papers/kra/anwendung.tex | 5 ++++-
 1 file changed, 4 insertions(+), 1 deletion(-)

(limited to 'buch/papers/kra/anwendung.tex')

diff --git a/buch/papers/kra/anwendung.tex b/buch/papers/kra/anwendung.tex
index 0deaf3c..6383984 100644
--- a/buch/papers/kra/anwendung.tex
+++ b/buch/papers/kra/anwendung.tex
@@ -19,7 +19,10 @@ Die Funktion die diese Differentialgleichung löst, ist die harmonische Schwingu
     x(t) = A \cos(\omega_0 t + \Phi), \quad \omega_0 = \sqrt{\frac{k}{m}}
 \end{equation}
 \begin{figure}
-    \input{papers/kra/images/simple_mass_spring.tex}
+    % move image to standalone because the physics package is
+    % incompatible with underbrace
+    \includegraphics{papers/kra/images/simple.pdf}
+    %\input{papers/kra/images/simple_mass_spring.tex}
     \caption{Einfaches Feder-Masse-System.}
     \label{kra:fig:simple_mass_spring}
 \end{figure}
-- 
cgit v1.2.1

