From fcbcb7d8d6bd066cf6a4d1f085f0dc7291266011 Mon Sep 17 00:00:00 2001
From: Nao Pross <naopross@thearcway.org>
Date: Fri, 24 Apr 2020 15:54:22 +0200
Subject: Add diagram for Bernoulli

---
 ph2hat_zf.tex | 9 ++++++++-
 1 file changed, 8 insertions(+), 1 deletion(-)

(limited to 'ph2hat_zf.tex')

diff --git a/ph2hat_zf.tex b/ph2hat_zf.tex
index f86e63d..0b7e65c 100644
--- a/ph2hat_zf.tex
+++ b/ph2hat_zf.tex
@@ -307,6 +307,12 @@ Der Term \(\varrho v^2 / 2\) wird \emph{dynamische Druck} genannt.
     p + \varrho g h + \frac{\varrho}{2} v^2 = (\text{Konstant})
 \]
 
+\begin{figure}[h] \centering
+    \resizebox{.9\linewidth}{!}{%
+        \input{fig/bernoulli}%
+    }
+\end{figure}
+
 \begin{remark}
 Bernoulli gilt f\"ur inkompressible Fluide, und gen\"ugt f\"ur Fl\"ussigkeite und Gase, sofern \(v \ll \) Schallgeschwidigkeit.
 \end{remark}
@@ -447,7 +453,8 @@ Das ist tats\"achlich \eqref{eqn:hagen-poiseuille} umformuliert.
 \]
 \end{definition}
 
-\begin{definition}[Zirkulation]
+\begin{definition}[Zirkulation] Ist ein Mass f\"ur die Wirbelst\"arke.
+Die Zirkulation ist eine makroskopische Gr\"osse und h\"ang vom Weg ab.
 \[
     \Gamma = \oint \vec{v} \di{\vec{l}}
 \]
-- 
cgit v1.2.1

